INSERT INTO `j-wms-operate`.b_location_status (id, status_code, status_name) VALUES ('0', 0, '新建');
INSERT INTO `j-wms-operate`.b_location_status (id, status_code, status_name) VALUES ('1', 1, '启用');
INSERT INTO `j-wms-operate`.b_location_status (id, status_code, status_name) VALUES ('2', 2, '冻结');